<template>
	<div class="sys-vislog-container">
		<el-card shadow="hover" :body-style="{ paddingBottom: '0' }">
			<el-form :model="state.queryParams" ref="queryForm" :inline="true">
				<el-form-item label="开始时间">
					<el-date-picker v-model="state.queryParams.startTime" type="datetime" placeholder="开始时间" value-format="YYYY-MM-DD HH:mm:ss" :shortcuts="shortcuts" />
				</el-form-item>
				<el-form-item label="结束时间" prop="code">
					<el-date-picker v-model="state.queryParams.endTime" type="datetime" placeholder="结束时间" value-format="YYYY-MM-DD HH:mm:ss" :shortcuts="shortcuts" />
				</el-form-item>
				<el-form-item>
					<el-button-group>
						<el-button type="primary" icon="ele-Search" @click="handleQuery" v-auth="'sysVislog:page'"> 查询 </el-button>
						<el-button icon="ele-Refresh" @click="resetQuery"> 重置 </el-button>
					</el-button-group>
				</el-form-item>
				<el-form-item>
					<el-button icon="ele-MapLocation" @click="openVisMap"> 热力图 </el-button>
				</el-form-item>
				<el-form-item>
					<el-button icon="ele-DeleteFilled" type="danger" @click="clearLog" v-auth="'sysVislog:clear'" disabled> 清空 </el-button>
				</el-form-item>
			</el-form>
		</el-card>

		<el-card class="full-table" shadow="hover" style="margin-top: 5px">
			<el-table :data="state.logData" style="width: 100%" v-loading="state.loading" border>
				<el-table-column type="index" label="序号" width="55" align="center" />
				<el-table-column prop="displayTitle" label="显示名称" width="150" align="center" show-overflow-tooltip />
				<el-table-column prop="actionName" label="方法名称" width="150" header-align="center" show-overflow-tooltip />
				<el-table-column prop="account" label="账号名称" width="100" align="center" show-overflow-tooltip />
				<el-table-column prop="realName" label="真实姓名" width="100" align="center" show-overflow-tooltip />
				<el-table-column prop="remoteIp" label="IP地址" min-width="120" align="center" show-overflow-tooltip />
				<el-table-column prop="location" label="登录地点" min-width="150" align="center" show-overflow-tooltip />
				<el-table-column prop="longitude" label="经度" min-width="100" align="center" show-overflow-tooltip />
				<el-table-column prop="latitude" label="纬度" min-width="100" align="center" show-overflow-tooltip />
				<el-table-column prop="browser" label="浏览器" min-width="150" align="center" show-overflow-tooltip />
				<el-table-column prop="os" label="操作系统" width="120" align="center" show-overflow-tooltip />
				<el-table-column prop="status" label="状态" width="70" align="center" show-overflow-tooltip>
					<template #default="scope">
						<el-tag type="success" v-if="scope.row.status === '200'">成功</el-tag>
						<el-tag type="danger" v-else>失败</el-tag>
					</template>
				</el-table-column>
				<el-table-column prop="elapsed" label="耗时(ms)" width="90" align="center" show-overflow-tooltip />
				<el-table-column prop="logDateTime" label="日志时间" width="160" align="center" fixed="right" show-overflow-tooltip />
			</el-table>
			<el-pagination
				v-model:currentPage="state.tableParams.page"
				v-model:page-size="state.tableParams.pageSize"
				:total="state.tableParams.total"
				:page-sizes="[10, 20, 50, 100]"
				small
				background
				@size-change="handleSizeChange"
				@current-change="handleCurrentChange"
				layout="total, sizes, prev, pager, next, jumper"
			/>
		</el-card>

		<VisMap ref="visMapRef" :title="state.dialogTitle" />
	</div>
</template>

<script lang="ts" setup name="sysVisLog">
import { onMounted, reactive, ref } from 'vue';
import { ElMessage, ElMessageBox } from 'element-plus';

import VisMap from './component/visMap.vue';

import { getAPI } from '/@/utils/axios-utils';
import { SysLogVisApi } from '/@/api-services/api';
import { SysLogVis } from '/@/api-services/models';

const visMapRef = ref<InstanceType<typeof VisMap>>();
const state = reactive({
	loading: false,
	queryParams: {
		startTime: undefined,
		endTime: undefined,
	},
	tableParams: {
		page: 1,
		pageSize: 20,
		total: 0 as any,
	},
	logData: [] as Array<SysLogVis>,
	dialogTitle: '',
});

onMounted(async () => {
	handleQuery();
});

// 查询操作
const handleQuery = async () => {
	if (state.queryParams.startTime == null) state.queryParams.startTime = undefined;
	if (state.queryParams.endTime == null) state.queryParams.endTime = undefined;

	state.loading = true;
	let params = Object.assign(state.queryParams, state.tableParams);
	var res = await getAPI(SysLogVisApi).apiSysLogVisPagePost(params);
	state.logData = res.data.result?.items ?? [];
	state.tableParams.total = res.data.result?.total;
	state.loading = false;
};

// 重置操作
const resetQuery = () => {
	state.queryParams.startTime = undefined;
	state.queryParams.endTime = undefined;
	handleQuery();
};

// 清空日志
const clearLog = async () => {
	ElMessageBox.confirm(`确定清空访问日志?`, '提示', {
		confirmButtonText: '确定',
		cancelButtonText: '取消',
		type: 'warning',
	})
		.then(async () => {
			state.loading = true;
			await getAPI(SysLogVisApi).apiSysLogVisClearPost();
			state.loading = false;

			ElMessage.success('清空成功');
			handleQuery();
		})
		.catch(() => {});
};

// 打开访问热力图
const openVisMap = async () => {
	state.dialogTitle = '访问者热力图';
	visMapRef.value?.openDialog();
};

// 改变页面容量
const handleSizeChange = (val: number) => {
	state.tableParams.pageSize = val;
	handleQuery();
};

// 改变页码序号
const handleCurrentChange = (val: number) => {
	state.tableParams.page = val;
	handleQuery();
};

const shortcuts = [
	{
		text: '今天',
		value: new Date(),
	},
	{
		text: '昨天',
		value: () => {
			const date = new Date();
			date.setTime(date.getTime() - 3600 * 1000 * 24);
			return date;
		},
	},
	{
		text: '上周',
		value: () => {
			const date = new Date();
			date.setTime(date.getTime() - 3600 * 1000 * 24 * 7);
			return date;
		},
	},
];
</script>
