<template>
	<div class="sys-vislog-container" v-loading="options.loading">
		<el-card shadow="hover" :body-style="{ padding: '5px 5px 0 5px', display: 'flex', width: '100%', height: '100%', alignItems: 'start' }">
			<el-form :model="state.queryParams" ref="queryForm" :show-message="false" :inlineMessage="true" :label-width="'60px'" style="flex: 1 1 0%">
				<el-row :gutter="10">
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="开始时间" prop="name">
							<el-date-picker v-model="state.queryParams.startTime" type="datetime" placeholder="开始时间" :shortcuts="shortcuts" />
						</el-form-item>
					</el-col>
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="结束时间" prop="code">
							<el-date-picker v-model="state.queryParams.endTime" type="datetime" placeholder="结束时间" :shortcuts="shortcuts" />
						</el-form-item>
					</el-col>
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="显示名称" prop="displayTitle">
							<el-input v-model="state.queryParams.displayTitle" clearable placeholder="显示名称" @keyup.enter.native="handleQuery(true)" />
						</el-form-item>
					</el-col>
					<el-col class="mb5" :xs="24" :sm="12" :md="8" :lg="6" :xl="6">
						<el-form-item label="操作人" prop="realName">
							<el-input v-model="state.queryParams.realName" clearable placeholder="操作人" @keyup.enter.native="handleQuery(true)" />
						</el-form-item>
					</el-col>
				</el-row>
			</el-form>

			<el-divider style="height: calc(100% - 5px); margin: 0 10px" direction="vertical" />

			<el-row>
				<el-col>
					<el-button-group>
						<el-button type="primary" icon="ele-Search" @click="handleQuery(true)" v-auth="'sysVislog:page'" :loading="options.loading"> 查询 </el-button>
						<el-button icon="ele-Refresh" @click="resetQuery" :loading="options.loading"> 重置 </el-button>
					</el-button-group>
				</el-col>
			</el-row>
		</el-card>

		<el-card class="full-table" shadow="hover" style="margin-top: 5px">
			<vxe-grid ref="xGrid" class="xGrid-style" v-bind="options" @sort-change="sortChange">
				<template #toolbar_buttons>
					<el-button icon="ele-DeleteFilled" type="danger" @click="handleClear" v-auth="'sysVislog:clear'"> 清空 </el-button>
					<el-button icon="ele-MapLocation" type="primary" @click="handleMap"> 热力图 </el-button>
				</template>
				<template #toolbar_tools> </template>
				<template #empty>
					<el-empty :image-size="200" />
				</template>
				<template #row_status="{ row }">
					<el-tag v-if="row.status === '200'" type="success">成功</el-tag>
					<el-tag v-else type="danger">失败</el-tag>
				</template>
				<template #pager>
					<vxe-pager
						:loading="options.loading"
						v-model:current-page="state.tableParams.page"
						v-model:page-size="state.tableParams.pageSize"
						:total="state.tableParams.total"
						@page-change="pageChange"
					/>
				</template>
			</vxe-grid>
		</el-card>

		<VisMap ref="mapRef" :title="state.title" />
	</div>
</template>

<script lang="ts" setup name="sysVisLog">
import { onMounted, reactive, ref, defineAsyncComponent } from 'vue';
import { ElMessage } from 'element-plus';
import { useDateTimeShortCust } from '/@/hooks/dateTimeShortCust';
import { auth } from '/@/utils/authFunction';
import { VxeGridInstance, VxePagerEvents, VxePagerDefines } from 'vxe-table';
import { useVxeTable } from '/@/hooks/vxeTableOptionsHook';

import { getAPI } from '/@/utils/axios-utils';
import { SysLogVisApi } from '/@/api-services';
import { SysLogVis } from '/@/api-services/models';

const VisMap = defineAsyncComponent(() => import('./component/visMap.vue'));

const xGrid = ref<VxeGridInstance>();
const mapRef = ref<InstanceType<typeof VisMap>>();
const shortcuts = useDateTimeShortCust();
const state = reactive({
	queryParams: {
		startTime: undefined as string | undefined,
		endTime: undefined as string | undefined,
		displayTitle: '',
		realName: '',
	},
	tableParams: {
		page: 1,
		pageSize: 50,
		field: 'id', // 默认的排序字段
		order: 'desc', // 排序方向
		descStr: 'desc', // 降序排序的关键字符
		total: 0 as any,
	},
	title: '',
});

// 表格参数配置
const options = useVxeTable<SysLogVis>({
	id: 'sysVisLog',
	name: '访问日志',
	columns: [
		// { type: 'checkbox', width: 40 },
		{ type: 'seq', title: '序号', width: 60, fixed: 'left' },
		{ field: 'displayTitle', title: '显示名称', minWidth: 150, showOverflow: 'tooltip' },
		{ field: 'actionName', title: '方法名称', minWidth: 150, showOverflow: 'tooltip' },
		{ field: 'account', title: '账号名称', minWidth: 150, showOverflow: 'tooltip' },
		{ field: 'realName', title: '真实姓名', minWidth: 150, showOverflow: 'tooltip' },
		{ field: 'remoteIp', title: 'IP地址', minWidth: 150, showOverflow: 'tooltip' },
		{ field: 'location', title: '登录地点', minWidth: 150, showOverflow: 'tooltip' },
		{ field: 'longitude', title: '经度', minWidth: 100, showOverflow: 'tooltip' },
		{ field: 'latitude', title: '纬度', minWidth: 100, showOverflow: 'tooltip' },
		{ field: 'browser', title: '浏览器', minWidth: 150, showOverflow: 'tooltip' },
		{ field: 'os', title: '操作系统', minWidth: 150, showOverflow: 'tooltip' },
		{ field: 'status', title: '状态', minWidth: 70, showOverflow: 'tooltip', slots: { default: 'row_status' } },
		{ field: 'elapsed', title: '耗时(ms)', minWidth: 100, showOverflow: 'tooltip' },
		{ field: 'logDateTime', title: '日志时间', minWidth: 150, showOverflow: 'tooltip' },
	],
	enableExport: auth('sysVislog:export'),
	searchCallback: () => handleQuery(),
	queryAllCallback: () => fetchData({ pageSize: 99999 }),
});

// 页面初始化
onMounted(async () => {
	await handleQuery();
});

// 查询操作
const handleQuery = async (reset = false) => {
	options.loading = true;
	if (reset) state.tableParams.page = 1;
	var res = await fetchData(null);
	xGrid.value?.loadData(res.data.result?.items ?? []);
	state.tableParams.total = res.data.result?.total;
	options.loading = false;
};

// 获取数据
const fetchData = async (tableParams: any) => {
	if (state.queryParams.startTime == null) state.queryParams.startTime = undefined;
	if (state.queryParams.endTime == null) state.queryParams.endTime = undefined;
	let params = Object.assign(state.queryParams, state.tableParams, tableParams);
	return getAPI(SysLogVisApi).apiSysLogVisPagePost(params);
};

// 重置操作
const resetQuery = () => {
	state.queryParams.startTime = undefined;
	state.queryParams.endTime = undefined;
	state.queryParams.displayTitle = '';
	state.queryParams.realName = '';
	handleQuery(true);
};

// 清空日志
const handleClear = async () => {
	options.loading = true;
	await getAPI(SysLogVisApi).apiSysLogVisClearPost();
	options.loading = false;
	ElMessage.success('清空成功');
	handleQuery(true);
};

// 打开访问热力图
const handleMap = async () => {
	state.title = '访问者热力图';
	mapRef.value?.openDialog();
};

// 改变页码序号或页面容量
const pageChange: VxePagerEvents.PageChange = ({ currentPage, pageSize }: VxePagerDefines.PageChangeEventParams) => {
	state.tableParams.page = currentPage;
	state.tableParams.pageSize = pageSize;
	handleQuery();
};

// 列排序
const sortChange = (options: any) => {
	state.tableParams.field = options.field;
	state.tableParams.order = options.order;
	handleQuery();
};
</script>
